<template>
  <div class="layout-default">
    <!-- Default layout wrapper -->
    <slot />
  </div>
</template>

<script setup lang="ts">
/**
 * Default Layout
 * 
 * This is a minimal example layout demonstrating Nuxt's layout system.
 * To use this layout in a page, add: definePageMeta({ layout: 'default' })
 * 
 * Learn more: https://nuxt.com/docs/guide/directory-structure/layouts
 */
</script>

<style scoped>
.layout-default {
  /* Add default layout styles here */
}
</style>
